Welcome to GB7ESX the ESSEX BBS QTH Witham, Essex JO01HT.
This system is running on an IBM clone with 1280K of memory and 6 COM PORTS.
The software used is Multi User, Multi Port software written by G1NNA.
The BBS is available on 50.670, 144.650, 432.675 and 433.650
with the call GB7ESX or ESXBBS NO SSID on these frequencies.

We also provide TheNode on 50.670, 144.650, 144.675, 432.675, 433.650
with full Xconnect facilities. There is NO! BBS access on 144.675MHz.
The call on all frequencies for TheNode is ESX or G1NNB.

The Radio,s used on this BBS and NODES are as follows:-
144.650 MHz Europa PMR, 144.675 MHz NOKIA PMR, 50.670 Westminster PMR
432.675 MHz Europa PMR, 433.650 MHz Yaesu FT-720R
This BBS and Nodes are self finanaced by the SYSOP George G1NNB who
is not a member of any group or club. Please treat the BBS and Nodes
with respect and conform with any request the SYSOP may request from
time to time.

The SYSOP (George G1NNB) can be reached by Telephone on (0376)515224
at any reasonable time ie not after midnight or before 8.00am.
